Damn that&#39;s sick that you can hold 250lbs on s...

Damn that&#39;s sick that you can hold 250lbs on such low calories, Paul. I&#39;m 210lbs @ 5&#39;11 and typically diet for the first 10 weeks on 3000 calories (365 carbs) and can lose 1.5lbs per week on that. A blessing and a curse I suppose because when it&#39;s mass building time, I fucking hate food.